%\cite{Rehm:IBIC2014-MOIYB1}
\bibitem{Rehm:IBIC2014-MOIYB1}
    G.~Rehm,
   \textquotedblleft{Highlights of IBIC 2013}\textquotedblright,
%  presented at IBIC2014, Monterey, CA, USA, paper MOIYB1, not published,
%  presented at the 3rd Int. Beam Instrumentation Conf., Monterey, CA, USA, paper MOIYB1, not published,
   presented at the 3rd International Beam Instrumentation Conference, Monterey, CA, USA, paper MOIYB1, not published,
    2014.
