%\cite{Caselle:IBIC2014-MOCZB1}
\bibitem{Caselle:IBIC2014-MOCZB1}
    C.M.~Caselle, M.~Brosi, S.A.~Chilingaryan, T.~Dritschler, N.~Hiller, V.~Judin, A.~Kopmann, A.-S.~Müller, L.~Petzold, J.~Raasch, L.~Rota, M.~Siegel, N.J.~Smale, J.L.~Steinmann, M.~Vogelgesang, M.~Weber, and S.~Wuensch,
%   C.M. Caselle \emph{et al.},
   \textquotedblleft{A Picosecond Sampling Electronic “KAPTURE” for Terahertz Synchrotron Radiation}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOCZB1, pp. 24--28,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOCZB1, pp. 24--28,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOCZB1, pp. 24--28,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/moczb1.pdf},
    2014.
