%\cite{Scheidt:IBIC2014-MOCYB1}
\bibitem{Scheidt:IBIC2014-MOCYB1}
    K.B.~Scheidt,
   \textquotedblleft{Non-Destructive Vertical Halo Monitor on the ESRF’s 6GeV Electron Beam}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOCYB1, pp. 2--6,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOCYB1, pp. 2--6,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOCYB1, pp. 2--6,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mocyb1.pdf},
    2014.
