%\cite{Raubenheimer:FEL2015-WEP014}
\bibitem{Raubenheimer:FEL2015-WEP014}
    T.O.~Raubenheimer,
   \textquotedblleft{LCLS-II: Status of the CW X-ray FEL Upgrade to the LCLS Facility}\textquotedblright,
%  in \emph{Proc. FEL2015}, WEP014, pp. 618--624,
%  in \emph{Proc. FEL2015}, Daejeon, Republic of Korea, August 2015, paper WEP014, pp. 618--624,
   in \emph{Proc. 37th International Free Electron Laser Conference (FEL2015)}, Daejeon, Republic of Korea, August 2015, paper WEP014, pp. 618--624,
    ISBN: 978-3-95450-134-2,
    \url{http://accelconf.web.cern.ch/AccelConf/FEL2015/papers/wep014.pdf},
    doi:10.18429/JACoW-FEL2015-WEP014, 2015.
