%\cite{Grünert:FEL2015-WED03}
\bibitem{Grünert:FEL2015-WED03}
    J.~Grünert, B.~Baranasic, J.~Buck, F.~Dietrich, M.~Dommach, W.~Freund, \emph{et al.},
%   J. Grünert \emph{et al.},
   \textquotedblleft{Photon Diagnostics and Photon Beamlines Installations at the European XFEL}\textquotedblright,
%  in \emph{Proc. FEL2015}, WED03, pp. 764--768,
%  in \emph{Proc. FEL2015}, Daejeon, Republic of Korea, August 2015, paper WED03, pp. 764--768,
   in \emph{Proc. 37th International Free Electron Laser Conference (FEL2015)}, Daejeon, Republic of Korea, August 2015, paper WED03, pp. 764--768,
    ISBN: 978-3-95450-134-2,
    \url{http://accelconf.web.cern.ch/AccelConf/FEL2015/papers/wed03.pdf},
    doi:10.18429/JACoW-FEL2015-WED03, 2015.
