%\cite{Andersson:FEL2015-TUP035}
\bibitem{Andersson:FEL2015-TUP035}
    J.~Andersson, F.~Curbis, M.~Isinger, F.~Lindau, and S.~Werin,
   \textquotedblleft{Operation of a Slit Emittance Meter in the MAX IV Gun Test Stand}\textquotedblright,
%  in \emph{Proc. FEL2015}, TUP035, pp. 444--447,
%  in \emph{Proc. FEL2015}, Daejeon, Republic of Korea, August 2015, paper TUP035, pp. 444--447,
   in \emph{Proc. 37th International Free Electron Laser Conference (FEL2015)}, Daejeon, Republic of Korea, August 2015, paper TUP035, pp. 444--447,
    ISBN: 978-3-95450-134-2,
    \url{http://accelconf.web.cern.ch/AccelConf/FEL2015/papers/tup035.pdf},
    doi:10.18429/JACoW-FEL2015-TUP035, 2015.
