%\cite{Shim:FEL2015-MOP082}
\bibitem{Shim:FEL2015-MOP082}
    C.H.~Shim, I.S.~Ko, and Y.W.~Parc,
   \textquotedblleft{New Soft X-Ray Undulator Line Using 10 GeV Electron Beam in PAL-XFEL}\textquotedblright,
%  in \emph{Proc. FEL2015}, MOP082, pp. 237--240,
%  in \emph{Proc. FEL2015}, Daejeon, Republic of Korea, August 2015, paper MOP082, pp. 237--240,
   in \emph{Proc. 37th International Free Electron Laser Conference (FEL2015)}, Daejeon, Republic of Korea, August 2015, paper MOP082, pp. 237--240,
    ISBN: 978-3-95450-134-2,
    \url{http://accelconf.web.cern.ch/AccelConf/FEL2015/papers/mop082.pdf},
    doi:10.18429/JACoW-FEL2015-MOP082, 2015.
